\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{2}{|r}|}
\hline
Assembly & arowana\_transcripts.fasta.transdecoder.cds & cds-no\_redundancy \\ \hline
\# contigs ($\geq$ 0 bp) & 47765 & 40089 \\ \hline
\# contigs ($\geq$ 1000 bp) & 31694 & 14122 \\ \hline
\# contigs ($\geq$ 5000 bp) & 2401 & 198 \\ \hline
\# contigs ($\geq$ 10000 bp) & 296 & 9 \\ \hline
\# contigs ($\geq$ 25000 bp) & 6 & 0 \\ \hline
\# contigs ($\geq$ 50000 bp) & 2 & 0 \\ \hline
Total length ($\geq$ 0 bp) & {\bf 88693317} & 40348176 \\ \hline
Total length ($\geq$ 1000 bp) & {\bf 78588546} & 26081310 \\ \hline
Total length ($\geq$ 5000 bp) & {\bf 17845038} & 1257993 \\ \hline
Total length ($\geq$ 10000 bp) & {\bf 4113786} & 109917 \\ \hline
Total length ($\geq$ 25000 bp) & {\bf 287265} & 0 \\ \hline
Total length ($\geq$ 50000 bp) & {\bf 153492} & 0 \\ \hline
\# contigs & 42098 & 27136 \\ \hline
Largest contig & {\bf 88050} & 14787 \\ \hline
Total length & {\bf 86541075} & 35409537 \\ \hline
GC (\%) & 54.72 & 54.87 \\ \hline
N50 & {\bf 2583} & 1524 \\ \hline
N75 & {\bf 1521} & 975 \\ \hline
L50 & 9748 & {\bf 7321} \\ \hline
L75 & 20692 & {\bf 14604} \\ \hline
\# N's per 100 kbp & 11.26 & {\bf 0.00} \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
